INSERT INTO config (config_name,config_value,config_default,config_descr,config_group,config_group_order,config_sub_group,config_sub_group_order,config_hidden,config_disabled) values ('oxidized.default_group','','','Set the default group returned','external',0,'oxidized',0,'0','0'),('oxidized.group_support','false','false','Enable the return of groups to Oxidized','external',0,'oxidized',0,'0','0');
