INSERT INTO `graph_types`(`graph_type`, `graph_subtype`, `graph_section`, `graph_descr`, `graph_order`) VALUES ('device',  'sgos_client_connections',  'network',  'HTTP Client Connections',  0);
INSERT INTO `graph_types`(`graph_type`, `graph_subtype`, `graph_section`, `graph_descr`, `graph_order`) VALUES ('device',  'sgos_server_connections',  'network',  'HTTP Server Connections',  0);
INSERT INTO `graph_types`(`graph_type`, `graph_subtype`, `graph_section`, `graph_descr`, `graph_order`) VALUES ('device',  'sgos_client_connections_active',  'network',  'HTTP Client Connections Active',  0);
INSERT INTO `graph_types`(`graph_type`, `graph_subtype`, `graph_section`, `graph_descr`, `graph_order`) VALUES ('device',  'sgos_server_connections_active',  'network',  'HTTP Server Connections Acitve',  0);
INSERT INTO `graph_types`(`graph_type`, `graph_subtype`, `graph_section`, `graph_descr`, `graph_order`) VALUES ('device',  'sgos_client_connections_idle',  'network',  'HTTP Client Connections Idle',  0);
INSERT INTO `graph_types`(`graph_type`, `graph_subtype`, `graph_section`, `graph_descr`, `graph_order`) VALUES ('device',  'sgos_server_connections_idle',  'network',  'HTTP Server Connections Idle',  0);
