INSERT INTO `config` (`config_name`,`config_value`,`config_default`,`config_descr`,`config_group`,`config_group_order`,`config_sub_group`,`config_sub_group_order`,`config_hidden`,`config_disabled`) VALUES ('webui.min_graph_height','300','300','Minimum Graph Height','webui',0,'graph',0,'1','0');