DROP TABLE IF EXISTS `cmpMemPool`;
DROP TABLE IF EXISTS `current`;
DROP TABLE IF EXISTS `fanspeed`;
DROP TABLE IF EXISTS `frequency`;
DROP TABLE IF EXISTS `voltage`;
