INSERT INTO config (config_name,config_value,config_default,config_descr,config_group,config_group_order,config_sub_group,config_sub_group_order,config_hidden,config_disabled) values ('oxidized.enabled','false','false','Enable Oxidized support','external',0,'oxidized',0,'0','0'),('oxidized.url','','','Oxidized API url','external',0,'oxidized',0,'0','0'),('oxidized.features.versioning','false','false','Enable Oxidized config versioning','external',0,'oxidized',0,'0','0');
