INSERT INTO `config` (`config_name`,`config_value`,`config_default`,`config_descr`,`config_group`,`config_group_order`,`config_sub_group`,`config_sub_group_order`,`config_hidden`,`config_disabled`) VALUES ('alert.macros.rule.state_sensor_ok','%sensors.sensor_current = %state_translations.state_value && %state_translations.state_generic_value = 0','%sensors.sensor_current = %state_translations.state_value && %state_translations.state_generic_value = 0','Ok state sensors','alerting',0,'macros',0,'1','0');
INSERT INTO `config` (`config_name`,`config_value`,`config_default`,`config_descr`,`config_group`,`config_group_order`,`config_sub_group`,`config_sub_group_order`,`config_hidden`,`config_disabled`) VALUES ('alert.macros.rule.state_sensor_warning','%sensors.sensor_current = %state_translations.state_value && %state_translations.state_generic_value = 1','%sensors.sensor_current = %state_translations.state_value && %state_translations.state_generic_value = 1','Warning state sensors','alerting',0,'macros',0,'1','0');
INSERT INTO `config` (`config_name`,`config_value`,`config_default`,`config_descr`,`config_group`,`config_group_order`,`config_sub_group`,`config_sub_group_order`,`config_hidden`,`config_disabled`) VALUES ('alert.macros.rule.state_sensor_critical','%sensors.sensor_current = %state_translations.state_value && %state_translations.state_generic_value = 2','%sensors.sensor_current = %state_translations.state_value && %state_translations.state_generic_value = 2','Critical state sensors','alerting',0,'macros',0,'1','0');
INSERT INTO `config` (`config_name`,`config_value`,`config_default`,`config_descr`,`config_group`,`config_group_order`,`config_sub_group`,`config_sub_group_order`,`config_hidden`,`config_disabled`) VALUES ('alert.macros.rule.state_sensor_unknown','%sensors.sensor_current = %state_translations.state_value && %state_translations.state_generic_value = 3','%sensors.sensor_current = %state_translations.state_value && %state_translations.state_generic_value = 3','Unknown state sensors','alerting',0,'macros',0,'1','0');
