ALTER TABLE `ports` CHANGE `ifInOctets_rate` `ifInOctets_rate` BIGINT(20) NULL DEFAULT NULL, CHANGE `ifOutOctets_rate` `ifOutOctets_rate` BIGINT(20) NULL DEFAULT NULL ;
